-- ---------------------------------------------------------------------------------------------------------------------
-- WARNING: BACKUP YOUR DATABASE BEFORE UPGRADING
-- THIS SCRIPT IS ONLY FOR UPGRADING 1.7.1 TO 1.7.2
-- THE CURRENT VERSION CAN BE FOUND AT `myems_system_db`.`tbl_versions`
-- ---------------------------------------------------------------------------------------------------------------------

START TRANSACTION;

INSERT INTO myems_system_db.tbl_menus (id,name,route, parent_menu_id,is_hidden)
VALUES
(312,'Meter Carbon','/meter/metercarbon',300,0);

-- UPDATE VERSION NUMBER
UPDATE `myems_system_db`.`tbl_versions` SET version='1.8.0', release_date='2022-02-28' WHERE id=1;

COMMIT;
