-- ---------------------------------------------------------------------------------------------------------------------
-- WARNING: BACKUP YOUR DATABASE BEFORE UPGRADING
-- THIS SCRIPT IS ONLY FOR UPGRADING 1.8.1 TO 1.8.2
-- THE CURRENT VERSION CAN BE FOUND AT `myems_system_db`.`tbl_versions`
-- ---------------------------------------------------------------------------------------------------------------------

START TRANSACTION;

-- UPDATE VERSION NUMBER
UPDATE `myems_system_db`.`tbl_versions` SET version='1.8.2', release_date='2022-03-16' WHERE id=1;

COMMIT;
